mips

Open RISC Technology

LA/Emulator

Suppliers

American Arium

Biomation

Hewlett-Packard

Tektronics

Embedded Performance, Inc.

Logic Analyzers/Emulators

mips

Open RISC Technology

Logic Analyzers

American Arium ML4400_{American Arium}

ML4400

MIPS® Processors Support: R3000®, R3051^{TM}

Features:

200 MHz State Analysis, 1 GHz Timing Analysis 360 Data Channels, 128K deep trace memory ROM emulation; Dynamic cache enable/disable Full Disassembly; Symbolic Debug (10K symbols) Performance analysis with histograms and statistics

Contact:

American Arium 14281 Chambers Road, Tustin, CA 92680 714-731-1661, 714-731-6344 FAX

MIPS and R3000 are registered trademarks of MIPS Technologies, Inc. R3051 is a trademark of IDT.

mips

Open RISC Technology

Logic Analyzers

BIOMATION CLAS 4000

Biomation, Inc.

CLAS 4000 Family Logic Analysis Systems

MIPS® Processors Support:

R3000®, R3051/2/81^{TM}, LR33000, PR3400 (others by request)

Features

Full speed data capture Single connection Processor Attachment Disassembly with symbolic display Simultaneous multiple microprocessor support Long trace memory to 2 Msamples of instructions Processor specific triggering and selective capture

Contact:

West (408) 434-2210 Japan 3-5688-6800

MIPS and R3000 are registered trademarks of MIPS Technologies, Inc. R3051, R3052, and R3081 are trademarks of IDT.

mips

Open RISC Technology

Logic Analyzers HP Preprocessor

Hewlett Packard

Preprocessor

MIPS® Processors Support:

R3000A, R3041^{TM}, R3051^{TM} LR33000, LR33020, LR33050 R4000®PC, R4400^{TM}PC, R4200^{TM}

Features

Reliable, repeatable probing of the chip at full speed in target system Time interval resolution to 2 ns Analog measurements with an integral 1 GSa/s oscilloscope Integration of code flow, timing waveforms and oscilloscope waveforms onto a single display Graphical human interface

Contact:

Local HP Sales Office

MIPS and R4000 are registered trademarks of MIPS Technologies, Inc. R4200 and R4400 are trademarks of MIPS Technologies, Inc. R3041 and R3051 are trademarks of IDT.

mips

Open RISC Technology

Logic Analyzers

Tektronix DAS, TLA500_{Tektronix}

DAS,TLA500

MIPS® Processors Support:

R3000®/R3000A, R33000/R33050, R3051^{TM}/R3052^{TM}/R3081^{TM}, R4000®PC/SC/MC, R4400^{TM}PC/SC/MC, R4600, R4200^{TM}

Features:

Real-time execution trace to 512K bus cycle depth Easily monitors & correlates multiple processor traces High-speed timing analysis with full bus-form display Disassembly setup (channel naming/grouping/clocking) software Hardware Breakpoints Performance Analysis Stand-alone or network-via-X-server operation Symbolic address display & triggering (5000 symbols)

Contact:

Gary Richmond 503-627-1968, 503-627-2009 FAX, Gary.K.Richmond@Tek.Com

MIPS, R3000 and R4000 are registered trademarks of MIPS Technologies, Inc. R4200 and R4400 are trademarks of MIPS Technologies, Inc. R3051, R3052, and R3081 are trademarks of IDT.

mips

Open RISC Technology

Emulators

EPI Sys-R3051_{Embedded Performance}

SYS-R3051

MIPS® Processors Support: IDT R3051^{TM}, R3052^{TM}, R3071^{TM}, R3081^{TM}, R3041^{TM}

Features:

DOS/386, MS Windows and SUN-4 Hosts Up to 33 MHz bus speed (Includes 3081 @ 50 MHz in half-bus mode) Build-in Memory tests and up to 4M bytes of Optional Overlay Memory Ethernet or serial interface to host computer Downloads up to 3M bytes/min. Accepts COFF, ECOFF, and S-record object files. Full speed trace using the same sampling rules as the processor Up to 32K Trace Frames at full execution speed Trace displayed in 1s and 0s or Disassembled with interleaved source lines Breakpoint and single step through ROM and exception handlers Dynamically controls reserved debugger pins Simulates interrupts and co-processor inputs Bundled with a powerful symbolic assembly-level debugger Available ’C’ source-level debugger with windowed interface designer-to-designer support

Contact:

David Johnson Embedded Performance, Inc., 1860 Barber Lane, Milpitas, CA 95035 (408) 434-2210, (408) 935-7970 FAX, email: sales@episupport.com

MIPS is a registered trademark of MIPS Technologies, Inc. R3041, R3051, R3052, R3071 and R3081 are trademarks of IDT.